; HTBclock.def : Declares the module parameters for the DLL.

LIBRARY      "HTBclock"
DESCRIPTION  'HTBclock Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here

	Clock
	Closeclock
